0%

5%

10%

15%

20%

Frequency of Misprediction nasa7 matrix300 tomcatv dodouc spice fpppp gcc espresso eqntott li

4096 entries; 2-bits per entry Inf entries; 2-bits per entry 1024 entries (2,2)