V a lu e o fH itU nd e rM is s fo rS P E C

0%

10%

20%

30%

40%

50%

60%

70%

80%

90%

100% swm256 fpppp hydro2d nasa7 wave5 mdijdp2 spice2g6 xlisp compress

Ratio of Memory Stall Time (v. No Hit Under Miss)

H itunder1miss

H itunder2misses

H itunder64misses